BOSCH – HGX5G7W81S Serie | 6, Hybrid Gas Range Cooker

PRODUCT DESCRIPTIONS

GENERAL

Main color of product

Black

Power of the heating elements

1 x 1.0 KW, 1 x 3.0 KW, 1 x 4.2 KW, 2 x 1.75 KW

Residual heat indicator

no

Number of heating & combination modes

6

Integrated Cleaning system

No

Door concept

Bottom

Usable volume (of cavity) – NEW (2010/30/EC)

125 l

Type of lid

Glass

Utensil drawer

No

Included accessories

1 x rotary spit, 1 x nozzle set for natural gas, 1 x cross support for espresso, 2 x grid, 1 x universal pan

SIZE AND WEIGHT

Dimensions

x 894 x mm

Net weight

81.9 kg

Plug type

No plug (electrical connection by electrician)

Length electrical supply cord

146 cm

Voltage

220-240 V

Connection rating

1,700 W

Fuse protection

16 A

Gas type

LPG G30 30 mbar

Alternative gas type

Nat gas H/E/(L) 20 (25) mbar

Gas connection rating

15,900 W

COMFORT

Power on indicator

No

Number of Single grates

1

Number of Double grates

2

Fast preheat

No

Pizza setting

No

SAFETY

Type of safety device for gas

Electromagnetic for each burner