BOSCH – FFL020MS2B Microwave Oven Solo, 20L – Black

KEY SPECIFICATIONS

Cavity inner surface: lacquered grey

User-friendly electronics: extremely

Easy and comfortable operation

Rotary dial

LED light

Side opening door left hinged

Automatic safety switch-off

Door contact switch

Integral cooling fan

27 cm Glass turntable

Open door button

Cleaning Assistance: hydrolyse manual